<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">%OZT%&amp;frlatex / This is a TeX code to test if french words are well hyphenated
%                                Copyright Bernard Gaulle as in french_doc.pdf
%
%                                                       last mods: 99/02/23
\catcode`@=11
\gdef\iORI{\@@input}
\gdef\bye{\egroup% to avoid message \end inside level 1...
          \end{document}}
\documentclass{article}
\usepackage{inputenc}%%%%%% to define \inputencoding
%\usepackage[T1]{fontenc}%%% here is the font encoding
\nofiles
\begin{document}
\global\let\DOinput\iORI
\makeatletter\let\@inpenc@test\relax\makeatother% avoid a warning about EC
\DOinput tstcoup.tex
\endinput
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%
%%      checksum        = "00515 22 72 853"
%%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
</pre></body></html>