<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\noindent document: wnpc10.tex translated from wnpc10.txt
\font\screen=wnpc10
\vfil
This little document shows how one may make use of the wnpc10 screen
display font for illustration in a manual.  Suppose for instance, that one wishes
to show an actual screen display which a program may present to the user.
Switch to the wnpc10 font, and $\ldots$
\medskip

\def\crtscreen{\obeylines\obeyspaces\offinterlineskip\screen\parindent=0pt}
{\crtscreen
ษออออออออออออป      HUMANITIES AND ARTS COMPUTING CENTER  DW-10
บษออออออออออปบ      University of Washington
บบ ษธีธีธีป บบ
บบ ศุฯุุฯุผ บบ
บบ ษุัุุัุป บบ      Copyright 1989 HACC
บศอนฦตฦตฦตฬอผบ
บ  ำูภูภูภฝ  บ
บ    HACC    บ
ศออออออออออออผ
}
\medskip
  In some cases, one may wish to show a rendering of a PC screen with non--Ascii
characters displayed, as above, or at other times, one may just wish to have
the verisimilitude obtained with a font resembling an actual screen display,
even if the text could perfectly well be printed without a special font:
\medskip
{\crtscreen
This is TeX, Version 2.1 (preloaded format=plain 88.7.5)  11 MAY 1989 18:01
  (PCTeX 2.10, (c)Personal TeX, Inc 1987. S/N 11003)
**
}
\vfil\vfil

\bye
</pre></body></html>